0

0.0

0.2

0.4

0.6

0.8

1.0

Intensit� (a.u.)

Ritardo

(fs)

S_{SHG} sperimentale con CaF_2 con SiO_2

SiO_2 FWHM=36.477 fs CaF_2 FWHM=30.362 fs