0 200 400 600 800 1000 1200 0

5000

10000

D

C

B A

Intensit� (a.u.)

Raman Scattering PolV-PolV OHD-Kerr FFT

0 200 400 600 800 1000 1200 0.0 0.4 0.8 1.2 1.6

Frequenza

(cm^{-1})