0 200 400 600 800 1000 1200 1400 1600 1800 2000 0

2

R_{OKE}( )

Frequenza

(cm^{-1})

Benzene (C_6H_6)

0 50 100 150 200 250

-0.5

0.0

0.5

1.0

1.5

2.0

2.5

3.0